)^3 c^{-2}

(pb GeV 3dp σ^3dE

-3 10 -2 10 -1 10 1 10 210 310 410 510 610 710 810 910 10 10 11 10 12 10 a) x 1

-1 x 10

-3 x 10

uncertainty ppσ 7 TeV 3.5 ± 0.9 TeV + 5.0%, - 3.9%

combined Spec.

fit combined t = 0.5 p μ NLO t = p μ NLO t = 2 p μ NLO (BKK) t = 2 p μ NLO

= 7 TeV s @ 0π syst, stat

= 0.9 TeV s @ 0π syst, stat

= 7 TeV s @ η syst, stat

fit NLO

0.5 1.0 1.5 2.0 2.5 3.0 3.5 b) fit NLO

0.5 1.0 1.5 2.0 2.5 3.0 3.5 c)

(GeV/c) tp 0.3 1 2 3 4 5 67 10 20 30 fit NLO

0.5 1.0 1.5 2.0 2.5 3.0 3.5 d)